<!--
 * @Author: zwq
 * @Date: 2021-11-19 10:55:33
 * @LastEditors: gtz
 * @LastEditTime: 2021-11-22 19:36:14
 * @Description:
-->
<template>
  <div class="chart-container">
    <chart height="100%" width="100%" />
  </div>
</template>

<script>
import Chart from '@/components/Charts/MixChart'

export default {
  name: 'electric',
  components: { Chart }
}
</script>

<style scoped>
.chart-container {
  position: relative;
  width: 100%;
  height: calc(100vh - 84px);
}
</style>


