<template>
	<div class="mod-config">
		<el-form :inline="true" :model="dataForm" @keyup.enter.native="getDataList()">
			<!-- <el-form-item>
				<el-input v-model="dataForm.key" :placeholder="$t('parameter')" clearable></el-input>
			</el-form-item> -->
			<el-form-item>
				<el-button @click="getDataList()">{{ $t('query') }}</el-button>
				<el-button v-if="$hasPermission('monitoring:qualityinspectionrecord:save')" type="primary" @click="addOrUpdateHandle()">{{ $t('add') }}</el-button>
			</el-form-item>
		</el-form>

		<base-table :data="dataList" :table-head-configs="tableConfigs" :max-height="calcMaxHeight(8)" @operate-event="handleOperations" @refreshDataList="getDataList" />

		<el-pagination
			@size-change="sizeChangeHandle"
			@current-change="currentChangeHandle"
			:current-page="pageIndex"
			:page-sizes="[10, 20, 50, 100]"
			:page-size="pageSize"
			:total="totalPage"
			layout="total, sizes, prev, pager, next, jumper"
		>
		</el-pagination>

		<!-- 弹窗, 新增 / 修改 -->
		<add-or-update
			v-if="addOrUpdateVisible"
			ref="addOrUpdate"
			:configs="addOrUpdateConfigs"
			@refreshDataList="getDataList"
			@destory-dialog="addOrUpdateVisible = false"
			@select-change="handleSelectChange"
		/>
	</div>
</template>

<script>
import { calcMaxHeight } from '@/utils'
import { timeFilter } from '@/utils/filters'
import AddOrUpdate from '@/components/base-dialog/addOrUpdate'
// import AddOrUpdate from './qualityInspectionRecord-add-or-update'
import i18n from '@/i18n'
import BaseTable from '@/components/base-table'
import TableOperateComponent from '@/components/base-table/components/operationComponent'
// import TableTextComponent from '@/components/base-table/components/detailComponent'

const tableConfigs = [
	{ prop: 'createTime', name: i18n.t('createTime'), filter: timeFilter },
	{
		prop: 'inspectionDetContent',
		name: '检测内容'
	},
	{ prop: 'checkTime', name: '检测时间', filter: timeFilter },
	{ prop: 'productionId', name: '产线id' },
	{ prop: 'sectionId', name: '工段id' },
	{ prop: 'checkPerson', name: '检测人员' },
	{ prop: 'source', name: '来源', filter: val => ({ 1: '手动', 2: '自动' }[val]) },
	{ prop: 'explainText', name: i18n.t('desc') },
	{ prop: 'remark', name: i18n.t('remark') },
	{ prop: 'operations', name: i18n.t('handle'), fixed: 'right', width: 180, subcomponent: TableOperateComponent, options: ['edit', 'delete'] }
]

const addOrUpdateConfigs = {
	type: 'dialog',
	infoUrl: '/monitoring/qualityInspectionRecord',
	fields: [
		{ name: 'checkTime', label: '检测时间', type: 'date', props: { style: 'width: 100%', type: 'datetime' }, placeholder: '请选择检测时间' },
		{ name: 'productionId', label: i18n.t('pl.title'), type: 'select', options: [] },
		{ name: 'sectionId', label: i18n.t('ws.title'), type: 'select', options: [] },
		{
			name: 'source',
			label: '来源',
			type: 'select',
			options: [
				{ value: 1, label: '手动', default: true },
				{ value: 2, label: '自动' }
			]
		},
		{ name: 'inspectionDetId', label: '检测内容', type: 'select', options: [] },
		{ name: 'checkPerson', label: '检测人员' },
		{ name: 'explainText', label: i18n.t('desc') },
		'remark'
	],
	operations: [
		{ name: 'cancel', showAlways: true },
		{ name: 'save', url: '/monitoring/qualityInspectionRecord', permission: 'monitoring:qualityinspectionrecord:save', showOnEdit: false },
		{ name: 'update', url: '/monitoring/qualityInspectionRecord', permission: 'monitoring:qualityinspectionrecord:update', showOnEdit: true }
	]
}

export default {
	data() {
		return {
			calcMaxHeight,
			addOrUpdateConfigs,
			tableConfigs,
			dataForm: {
				key: ''
			},
			dataList: [],
			pageIndex: 1,
			pageSize: 10,
			totalPage: 0,
			dataListLoading: false,
			dataListSelections: [],
			addOrUpdateVisible: false
		}
	},
	components: {
		AddOrUpdate,
		BaseTable
	},
	activated() {
		this.getDataList()
		this.getInspectionDet()
		this.getWorkSections()
		this.getProductLines()
	},
	methods: {
		// handle
		async handleSelectChange({ name, id }) {
			if (name === 'productionId') {
				// 如果选择了产线，就依据此更新工单的选项
				await this.getWorkSections(id)
			}
		},
		// 获取检测内容
		getInspectionDet() {
			this.$http({
				url: this.$http.adornUrl('/monitoring/qualityInspectionDet/page'),
				method: 'get',
				params: this.$http.adornParams({
					page: this.pageIndex,
					limit: this.pageSize,
					key: this.dataForm.key
				})
			}).then(({ data: res }) => {
				console.log('insdet:', res)
				const insDetOpt = this.addOrUpdateConfigs.fields.find(item => item.name === 'inspectionDetId')
				if (insDetOpt) {
					insDetOpt.options = res.data.list.map(item => ({ value: item.id, label: item.content })) || []
				}
			})
		},
		// 获取产线
		getProductLines() {
			this.$http({
				url: this.$http.adornUrl('/monitoring/productionLine/page'),
				method: 'get',
				params: this.$http.adornParams({
					// 	page: this.pageIndex,
					// 	limit: this.pageSize,
					// 	key: this.dataForm.key
				})
			}).then(({ data: res }) => {
				const plOpt = this.addOrUpdateConfigs.fields.find(item => item.name === 'productionId')
				if (plOpt) {
					plOpt.options = res.data.list.map(item => ({ value: item.id, label: item.name })) || []
				}
			})
		},
		// 获取工段
		getWorkSections(lineId) {
			this.$http({
				url: this.$http.adornUrl('/monitoring/workshopSection/page'),
				method: 'get',
				params: lineId
					? this.$http.adornParams({
							// page: this.pageIndex,
							// limit: this.pageSize,
							// key: this.dataForm.key
							lineId
					  })
					: {}
			}).then(({ data: res }) => {
				if (this.addOrUpdateVisible) {
					if (res.data.total === 0) {
						this.$message.error('该产线没有工段')
					} else {
						this.$message.success(`该产线有 ${res.data.total} 条工段`)
					}
				}
				const wsOpt = this.addOrUpdateConfigs.fields.find(item => item.name === 'sectionId')
				if (wsOpt) {
					wsOpt.options = res.data.list.map(item => ({ value: item.id, label: item.name })) || []
				}
			})
		},
		// 获取数据列表
		getDataList() {
			this.addOrUpdateVisible = false
			this.dataListLoading = true
			this.$http({
				url: this.$http.adornUrl('/monitoring/qualityInspectionRecord/page'),
				method: 'get',
				params: this.$http.adornParams({
					page: this.pageIndex,
					limit: this.pageSize,
					key: this.dataForm.key
				})
			}).then(({ data }) => {
				if (data && data.code === 0) {
					this.dataList = data.data.list
					this.totalPage = data.data.total
				} else {
					this.dataList = []
					this.totalPage = 0
				}
				this.dataListLoading = false
			})
		},
		// 每页数
		sizeChangeHandle(val) {
			this.pageSize = val
			this.pageIndex = 1
			this.getDataList()
		},
		// 当前页
		currentChangeHandle(val) {
			this.pageIndex = val
			this.getDataList()
		},
		// 多选
		selectionChangeHandle(val) {
			this.dataListSelections = val
		},
		handleOperations({ type, data: id }) {
			switch (type) {
				case 'edit':
					return this.addOrUpdateHandle(id)
				case 'delete':
					return this.deleteHandle(id)
			}
		},
		// 新增 / 修改
		addOrUpdateHandle(id) {
			this.addOrUpdateVisible = true
			this.$nextTick(() => {
				this.$refs.addOrUpdate.init(id)
			})
		},
		// 删除
		deleteHandle(id) {
			var ids = id
				? [id]
				: this.dataListSelections.map(item => {
						return item.id
				  })
			this.$confirm(`${ i18n.t('prompt.info', { handle: id ? i18n.t('delete').toLowerCase() : i18n.t('deleteBatch').toLowerCase() }) }`, i18n.t('prompt.title'), {
				confirmButtonText: i18n.t('confirm'),
				cancelButtonText: i18n.t('cancel'),
				type: 'warning'
			}).then(() => {
				this.$http({
					url: this.$http.adornUrl('/monitoring/qualityInspectionRecord'),
					method: 'delete',
					data: this.$http.adornData(ids, false, 'raw')
				}).then(({ data }) => {
					if (data && data.code === 0) {
						this.$message({
							message: i18n.t('prompt.success'),
							type: 'success',
							duration: 1500,
							onClose: () => {
								this.getDataList()
							}
						})
					} else {
						this.$message.error(data.msg)
					}
				})
			})
		}
	}
}
</script>
