<!-- 
    filename: FanSequence.vue
    author: liubin
    date: 2023-12-06 09:40:51
    description: 
-->

<template>
	<Container name="风机运行频率" size="middle" style="">
		<!-- <div class="" style="position: absolute; top: 26px; left: 220px">
			<Switcher />
		</div> -->
		<div
			class="absolute"
			style="
				padding: 5px 12px;
				display: grid;
				grid-template-columns: repeat(2, 1fr);
				grid-auto-rows: auto;
				gap: 10px;
			">
			<ShadowRect v-for="(value, key, i) in fanFrequencyInfo" :key="i" :rounded="false">
				<span
					style="
						font-size: 18px;
						line-height: 1.15;
						flex: 3.5;
						text-align: right;
						padding-right: 8px;
						letter-spacing: 1px;
					">
					{{ key }}:
				</span>
				<span style="font-size: 20px; line-height: 1.15; flex: 1">
					{{ value }}Hz
				</span>
			</ShadowRect>
		</div>
	</Container>
</template>

<script>
import Container from '../components/Container.vue';
import ShadowRect from '../components/ShadowRect.vue';
// import Switcher from '../components/Switcher';
export default {
	name: 'FanSequence',
	components: { Container, ShadowRect },
	computed: {
		fanFrequencyInfo() {
			return this.$store.state.websocket.fanFrequencyInfo
		}
	},
	props: {},
	data() {
		return {};
	},
	mounted() {

	},
	methods: {
	}
};
</script>

<style scoped lang="scss"></style>
