<!--
 * @Author: zwq
 * @Date: 2021-07-19 15:18:30
 * @LastEditors: zhp
 * @LastEditTime: 2023-12-29 16:41:18
 * @Description:
-->
<template>
  <div id="container" ref="container" class="visual-container" :style="styles">
    <el-row class="container-title" :style="{
      height: 88 + 'px',
      lineHeight: 88 + 'px',
      fontSize: 31 + 'px'
    }">
      <img src="../../assets/img/logo.png" style="width:1.1em;position:relative;top:.22em" alt="">
      许昌安彩冷端看板
      <h3 class="unit">单位：河南汇融科技服务有限公司</h3>
      <h3 class="time">{{ times }}</h3>
      <!-- <el-button
        type="text"
        class="title-button"
        :style="{ right: 33 + 'px', top: 37 + 'px' }"
        @click="changeFullScreen"
      >
        <svg-icon v-if="isFullScreen" icon-class="unFullScreenView" />
        <svg-icon v-else icon-class="fullScreenView" />
      </el-button> -->
    </el-row>
    <el-row class="container-main flex-col" type="flex">
      <el-row :style="{ padding: '0 ' + 9 + 'px' }" :gutter="15" type="flex" class="flex-1">
        <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="8">
          <base-container :title="'切割数据'" :title-icon="'eqAlarm'">
            <base-table1 :page="page1" :limit="9" :show-index="false" :table-config="cutProps"
              :table-data="cutTableDataList" />
          </base-container>
        </el-col>

        <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="8">
          <base-container :title="'产量及良率统计'" :title-icon="'productLine'">
            <!-- <div style="width: 45%;position: absolute; top: 3em; right: 3em;">
              <top-radio-group />
            </div> -->
            <!-- 像下面这样表格里的limit值，也许可以用js动态计算出来 -->
            <double-y-chart ref="productChart" :id="'doubleYChart'" :name-list="cxNameList" :data-list="cxDataList" :height="359"
              :show-legend="true" />
          </base-container>
        </el-col>

        <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="8">
          <base-container :title="'ISRA 缺陷数据'" :title-icon="'eqMonitoring'">
            <base-table1 :page="page2" :limit="9" :show-index="false" :table-config="ISRATableProps"
              :table-data="ISRAList" />
          </base-container>
        </el-col>
      </el-row>

      <el-row :style="{ padding: '0 ' + 9 + 'px' }" :gutter="10" type="flex" class="flex-1">
        <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="12">
          <base-container :height="256" :title="'废片 缺陷数据'" :title-icon="'energyMonitoring'">
            <!-- <div style="width: 45%;position: absolute; top: 3em; right: 3em;">
              <top-radio-group />
            </div> -->
            <!-- <el-row :gutter="9"> -->
            <!-- <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="24"> -->
            <pile-bar-chart  ref="pileChart" :name-list="EnergyMonitoringNameList" :data-list="EnergyMonitoringList"
              :height="359" />
            <!-- </el-col> -->
            <!-- <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="12">
                <base-table3
                  :page="2"
                  :limit="5"

                  :table-config="qualityTableProps2"
                  :table-data="qualityList2"
                />
              </el-col> -->
            <!-- </el-row> -->
          </base-container>
        </el-col>
        <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="14">
          <base-container :height="318 + 338 + 16" :title="'设备状态监控'" :title-icon="'scrap'">
            <!-- <div style="width: 45%;position: absolute; top: 3em; right: 3em;">
              <top-radio-group />
            </div> -->
            <!-- 像下面这样表格里的limit值，也许可以用js动态计算出来 -->
            <el-col :span="6">
              <base-table1 :page="page3" :limit="9" :show-index="false" :table-config="EqMonitoringPropsFun"
                :table-data="funList" />
            </el-col>
            <el-col :span="6">
              <base-table1 :page="page4" :limit="9" :show-index="false" :table-config="EqMonitoringPropsFun"
                :table-data="annealFunList" />
            </el-col>
            <el-col :span="12" style="float: right;">
              <base-table1 :page="page5" :limit="9" :show-index="false" :table-config="EqMonitoringProps"
                :table-data="realEqList" />
            </el-col>
            <!-- <double-y-chart :id="'doubleYChart'" :name-list="cxNameList" :data-list="cxDataList" :height="359"
              :show-legend="true" /> -->
          </base-container>
        </el-col>
      </el-row>

      <!-- end  -->
      <!-- <el-col :span="16">
              <el-row>
                <el-col :style="{ margin: 8 + 'px' + ' 0' }" :span="24">
                  <base-container  :height="672">
                    <base-video :video-height="624"  />
                  </base-container>
                </el-col>
              </el-row>
            </el-col>
      -->
    </el-row>
  </div>
</template>

<script>
import baseContainer from './components/baseContainer'
import baseTable1 from './components/baseTable'
// import baseTable2 from './components/baseTable'
// import baseTable3 from './components/baseTable'
import TopRadioGroup from './components/topRadioGroup'
// import pieChart1 from './components/PieChart'
// import pieChart2 from './components/PieChart'
// import pieChart3 from './components/PieChart'
// import { mapGetters } from 'vuex'
import screenfull from 'screenfull'
import moment from "moment"
// import BaseVideo from './components/baseVideo.vue'
import alarmLevel from './components/alarmLevel'
import pileBarChart from './components/pileBarChart'

// import axios from '@/utils/request'
import doubleYChart from './components/doubleYChart '
// import elementResizeDetectorMaker from 'element-resize-detector';
// var erd = elementResizeDetectorMaker(); //创建实例
// let resizeFun = null
import { parseTime } from '../core/mixins/code-filter'


import LinearBarChart from './components/linearBarChart'
const qualityYearTableProps= []
const EqMonitoringPropsFun = [
  { prop: 'equipmentName', label: '设备名称' },
  { prop: 'status', label: '运行状态', width: 80}
]
const EqMonitoringProps = [
  { prop: 'productLine', label: '产线' },
  { prop: 'equipmentName', label: '设备名称' },
  { prop: 'equipmentCode', label: '设备编码' },
  {
    prop: 'status',
    label: '运行状态',
    filter: (val) =>
      val != null ? ['正常', '计划停机', '故障'][val] : '',
  },
  {
    prop: 'error',
    label: '故障状态',
    filter: (val) => (val != null ? (val ? '是' : '否') : ''),
  },
]
const cutProps = [
  { prop: 'lineName', label: '产线', width: 50 },
  { prop: 'time', label: '时间' },
  { prop: 'size', label: '规格' },
  { prop: 'productArea', label: '良品面积', width: 80 },
  { prop: 'wasteArea', label: '废片面积', width: 80 },
  { prop: 'product', label: '良品率', width: 80 },
]
const cxNameList = ['周一', '周二', '周三', '周四', '周五']

const cxDataList = [
  {
    topColor: '#9DD5FF',
    bottomColor: '#1295FF',
    name: '电耗能',
    data: [100, 150, 121, 97, 140]
  },
  {
    topColor: '#FF8BC3',
    bottomColor: '#EB46A1',
    name: '水耗能',
    data: [110, 110, 151, 77, 110]
  },
  {
    topColor: '#85F6E9',
    bottomColor: '#2EC6B4',
    name: '天然气',
    data: [110, 120, 171, 287, 40]
  },
  {
    topColor: '#9496FF',
    bottomColor: '#6567FF',
    name: '焦炉煤气',
    data: [140, 157, 122, 27, 240]
  },
  {
    topColor: '#F68E8A',
    bottomColor: '#E95552',
    name: '余热发电',
    data: [170, 180, 127, 17, 340]
  },
  {
    topColor: '#FFE873',
    bottomColor: '#E7AE2A',
    name: '二氧化硫',
    data: [140, 160, 121, 57, 170]
  }
]
const ISRATableProps = [
  {
    prop: 'linename',
    label:'产线'
  },
  {
    prop: 'time',
    label: '时间'
  },
  {
    prop: 'type',
    label:'缺陷类型'
  },
  {
    prop: 'num',
    label: '缺陷数量'
  },
  {
    prop: 'percent',
    label: '占比'
  }
]

let pageFun1 = null
let pageFun2 = null
let pageFun3 = null
let pageFun4 = null
let pageFun5 = null

export default {
  name: 'ProductionMonitoringCockpit',
  components: {
    baseContainer,
    baseTable1,
    pileBarChart,
    TopRadioGroup,
    doubleYChart,
    LinearBarChart
    // pieChart1,
    // pieChart2
    // pieChart3
    // BaseVideo
  },
  data() {
    return {
      beilv2: 1,
      beilv: 1,
      value: 100,
      EqMonitoringProps,
      EqMonitoringPropsFun,
      realEqList:[],
      qualityYearTableProps,
      ISRATableProps,
      orderList: [],
      times: '',
      ISRAList:[],
      EnergyMonitoringNameList: [],
      equipmentList: [],
      EnergyMonitoringList: [],
      // offsetWidth: null,
      cxNameList,
      cxDataList,
      cutProps,
      cutTableDataList:[],
      clientWidth: 0,
      containerWidth: 111111,
      isFullScreen: false,
      cutWsData: {},
      funWsData: {},
      SJGWsData: {},
      // orderProcessList: [],
      dateType: '0',
      funList:[],
      annealFunList: [],
      queryParams: {
        pageNo: 1,
        pageSize: 10,
        equipmentId: null,
        productionLineId: null,
      },
      page1: 1,
      page2: 1,
      page3: 1,
      page4: 1,
      page5: 1,
      total1: 1,
      total2: 1,
      total3: 1,
      total4: 1,
      total5: 1,
      firstContent1: false,
      firstContent2: false,
      firstContent3: false,
      firstContent4: false
    }
  },
  computed: {
    // ...mapGetters(['sidebar']),
    styles() {
      const v = Math.floor(this.value * this.beilv2 * 100) / 10000
      return {
        transform: `scale(${v})`,
        transformOrigin: 'top left'
      }
    }
  },

  watch: {
    clientWidth(val) {
      if (!this.timer) {
        this.clientWidth = val
        this.beilv2 = this.clientWidth / 1920
        this.timer = true
        let _this = this
        setTimeout(function () {
          _this.timer = false
        }, 500)
      }
      // 这里可以添加修改时的方法
      this.windowWidth(val);
    }
  },
  created() {
    // this.fetchList('exception-alarm')
    // this.fetchList('inAndOutOfEachLine')
    // this.fetchList('order-process')
    // this.fetchList('line-chart-data')
    this.init()
  },
  mounted() {
    this.funInitWebSocket()
    this.CutInitWebSocket()
    this.SJGInitWebSocket()

    this.getTimes()
    const _this = this;
    _this.beilv2 = document.documentElement.clientWidth / 1920
    window.onresize = () => {
      return (() => {
        _this.clientWidth = `${document.documentElement.clientWidth}`
        this.beilv2 = _this.clientWidth / 1920
      })()
    }
    this.getList()
    // const _this = this;
    // window.onresize = () => {
    //   return (() => {
    //     _this.clientWidth = `${document.documentElement.clientWidth}`
    //     this.beilv2 = _this.clientWidth / 1920
    //   })()
    // }
    // this.beilv2 = window.innerWidth / 1920
    // addEventListener('resize', resizeFun = () => {
    //   this.beilv2 = window.innerWidth / 1920
    // })
    // erd.listenTo(document, (element) => {
    //   this.beilv2 = element.offsetWidth / 1920

    //   // var width = element.offsetWidth;
    //   // var height = element.offsetHeight;
    // });
  },
  beforeDestroy() {
    //离开页面删除检测器和所有侦听器
    // erd.uninstall(document); //这里用ref是因为vue离开页面后获取不到dom
    // removeEventListener('resize', resizeFun)
    clearInterval(pageFun1)
    clearInterval(pageFun2)
    clearInterval(pageFun3)
    clearInterval(pageFun4)
    clearInterval(pageFun5)
  },
  methods: {
    getList() {
      // this.loading = true;
      // 执行查询
      // let data = '{ "data": { "FanFrequencyInfo": { "1#10处拐角冷却风机": "0", "1#L型吊墙冷却风机": "0", "1#助燃风机": "44.8", "1#澄清带池壁风机": "40", "1#融化带池壁风机": "43", "1#钢碹碴小炉垛风机": "48", "2#10处拐角冷却风机": "50", "2#L型吊墙冷却风机": "49.7", "2#助燃风机": "0", "2#澄清带池壁风机": "0", "2#融化带池壁风机": "0", "2#钢碹碴小炉垛风机": "48", "3#澄清带池壁风机": "0", "3#融化带池壁风机": "0", "4#澄清带池壁风机": "40", "4#融化带池壁风机": "43" } }, "type": "FanFrequencyInfo" }'
      // let obj = JSON.parse(data)
      // // for()
      // let arr = []
      // for (let i in obj.data.FanFrequencyInfo) {
      //   arr.push({
      //     equipmentName: i,
      //     status: obj.data.FanFrequencyInfo[i]
      //   })
      // }
      // this.funList = arr``
      this.$axios.get(
        '/monitoring/equipment-monitor/realtime-page',
        'get',
        this.queryParams
      ).then((res) => {
        this.realEqList = res.data.list;
        this.total5 = Math.ceil(res.data.list.length / 9)
        setInterval(pageFun3 = () => {
          if (this.page5 >= this.total5) {
            this.page5 = 1
          } else {
            this.page5 += 1
          }
        }, 30000)
        // this.total = response.data.total;
        // this.loading = false;
      });
    },
    getTimes() {
      setInterval(this.getTimesInterval, 1000);
    },
    getTimesInterval: function () {
      let _this = this;
      let year = new Date().getFullYear(); //获取当前时间的年份
      let month = new Date().getMonth() + 1; //获取当前时间的月份
      let day = new Date().getDate(); //获取当前时间的天数
      let hours = new Date().getHours(); //获取当前时间的小时
      let minutes = new Date().getMinutes(); //获取当前时间的分数
      let seconds = new Date().getSeconds(); //获取当前时间的秒数
      //当小于 10 的是时候，在前面加 0
      if (hours < 10) {
        hours = "0" + hours;
      }
      if (minutes < 10) {
        minutes = "0" + minutes;
      }
      if (seconds < 10) {
        seconds = "0" + seconds;
      }
      //拼接格式化当前时间
      this.times = year + "-" + month + "-" + day + " " + hours + ":" + minutes + ":" + seconds;
    },
    SJGInitWebSocket() {
      if (typeof (WebSocket) === 'undefined') {
        alert('您的浏览器不支持WebSocket')
      } else {
        // const wsUrl = 'ws://192.168.1.74:48080/websocket/message?userId=EN111'
        // const wsUrl = 'ws://192.168.1.104:48082/websocket/message?userId=SJG'
        let date = new Date().valueOf()
        const SJGWsUrl = `ws://10.70.2.2:8080/websocket/message?userId=COLD${date}`
        this.SJGWebsocket = new WebSocket(SJGWsUrl)
        // 监听 WebSocket 连接
        this.SJGWebsocket.onopen = this.SJGWebsocketOnOpen
        // 监听 WebSocket 错误信息
        this.SJGWebsocket.onerror = this.SJGWebsocketOnError
        // 监听 WebSocket 消息
        this.SJGWebsocket.onmessage = this.SJGWebsocketOnMessage
        // 监听 webSocket 断开信息
        this.SJGWebsocket.onclose = this.SJGWebsocketClose
      }
    },
    CutInitWebSocket() {
      if (typeof (WebSocket) === 'undefined') {
        alert('您的浏览器不支持WebSocket')
      } else {
        // const wsUrl = 'ws://192.168.1.74:48080/websocket/message?userId=EN111'
        // const wsUrl = 'ws://192.168.1.104:48082/websocket/message?userId=SJG'
        let date = new Date().valueOf()
        const cutWsUrl = `ws://10.70.2.2:8080/websocket/message?userId=CUTTING${date}`

        this.cutWebsocket = new WebSocket(cutWsUrl)
        // 监听 WebSocket 连接
        this.cutWebsocket.onopen = this.cutWebsocketOnOpen
        // 监听 WebSocket 错误信息
        this.cutWebsocket.onerror = this.cutWebsocketOnError
        // 监听 WebSocket 消息
        this.cutWebsocket.onmessage = this.cutWebsocketOnMessage
        // 监听 webSocket 断开信息
        this.cutWebsocket.onclose = this.cutWebsocketClose
      }
    },
    funInitWebSocket() {
      if (typeof (WebSocket) === 'undefined') {
        alert('您的浏览器不支持WebSocket')
      } else {
        // const wsUrl = 'ws://192.168.1.74:48080/websocket/message?userId=EN111'
        // const wsUrl = 'ws://192.168.1.104:48082/websocket/message?userId=SJG'
        let date = new Date().valueOf()
        const funWsUrl = `ws://10.70.180.10:8081/xc-screen/websocket/${date}`
        this.funWebsocket = new WebSocket(funWsUrl)
        // 监听 WebSocket 连接
        this.funWebsocket.onopen = this.funWebsocketOnOpen
        // 监听 WebSocket 错误信息
        this.funWebsocket.onerror = this.funWebsocketOnError
        // 监听 WebSocket 消息
        this.funWebsocket.onmessage = this.funWebsocketOnMessage
        // 监听 webSocket 断开信息
        this.funWebsocket.onclose = this.funWebsocketClose
      }
    },
    funWebsocketOnOpen() {
      console.log('socket连接成功')
      this.SJGWebsocket.onmessage()
    },
    // 连接建立失败重连
    funWebsocketOnError(e) {
      this.funInitWebSocket()
    },
    // 数据接收
    funWebsocketOnMessage(e) {
      this.funWsData = e?.data ? JSON.parse(e?.data) : {}
      // FanInfo
      if (this.funWsData.type === 'AnnealFanInfo') {
        let arr = []
        for (let i in this.funWsData.data.annealFanInfo) {
          arr.push({
            equipmentName: i,
            status: this.funWsData.data.annealFanInfo[i]
          })
        }
        this.annealFunList = arr
        this.total3 = Math.ceil(arr.length / 9)
        if ( this.page3 > this.total3) {
          this.page3 = 1
        }
        if (!this.firstContent3) {
          setInterval(pageFun3 = () => {
            if (this.page3 >= this.total3) {
              this.page3 = 1
            } else {
              this.page3 += 1
            }
          }, 30000)
          this.firstContent3 = true
        }
      }
      if (this.funWsData.type === 'FanInfo') {
        let arr = []
        for (let i in this.funWsData.data.fanInfo) {
          arr.push({
            equipmentName: i,
            status: this.funWsData.data.fanInfo[i]
          })
        }
        this.funList = arr
        this.total4 = Math.ceil(arr.length / 9)
        if ( this.page4 > this.total4) {
          this.page4 = 1
        }
        if (!this.firstContent4) {
          setInterval(pageFun4 = () => {
            if (this.page4 >= this.total4) {
              this.page4 = 1
            } else {
              this.page4 += 1
            }
          }, 30000)
          this.firstContent4 = true
        }
      }
    },
    cutWebsocketOnOpen() {
      console.log('socket连接成功')
      this.SJGWebsocket.onmessage()
    },
    // 连接建立失败重连
    cutWebsocketOnError(e) {
      this.CutInitWebSocket()
    },
    // 数据接收
    cutWebsocketOnMessage(e) {
      this.cutWsData = e?.data ? JSON.parse(e?.data) : {}
      if (this.cutWsData.type === 'cutting' && this.cutWsData.name === 'table') {
        this.cutTableDataList = this.cutWsData.productHourData.map((ele, index) => {
          // if (ele.progressRate != 1) {
          return {
            id: ele.id,
            lineName: ele.lineName,
            time: moment(ele.time).format("MM-DD hh") + '时',
            size: ele.size,
            productArea: ele.productArea + '㎡',
            wasteArea: ele.wasteArea + '㎡',
            product: (ele.product * 100).toFixed(2) + '%'

          }
          // }
        });
        this.total1 = Math.ceil(this.cutWsData?.productHourData?.length / 9)
        if ( this.page1 > this.total1) {
          this.page1 = 1
        }
        if (!this.firstContent1) {
          setInterval(pageFun1 = () => {
            if (this.page1 >= this.total1) {
              this.page1 = 1
            } else {
              this.page1 += 1
            }
          }, 30000)
          this.firstContent1 = true
        }
      } else if (this.cutWsData.type === 'cutting' && this.cutWsData.name === 'chart' && this.cutWsData.dateType === 'day') {
        let nameList = []
        let nameWasteList = []
        let topNameList = []
        let productList = []
        let wasteList = []
        let sumAreaList = []
        let yieldList = []
        // this.cutTableDataList = 
        this.cutWsData.coldDetData.forEach((ele, index) => {
          nameList.push(ele.lineName)
          topNameList.push('产线: ' + ele.lineName + '   ' + '总面积:' + ele.sumArea)
          productList.push(ele.productArea)
          wasteList.push(ele.wastArea)
          nameWasteList.push('缺陷面积:' + ele.wastArea)
          sumAreaList.push(ele.sumArea)
          yieldList.push((ele.yield *100).toFixed(3))
        })
        this.$refs.pileChart.initChart(nameList, topNameList, nameWasteList, productList, wasteList)
        this.$refs.productChart.initChart(nameList, yieldList, sumAreaList)
      }
    },
    SJGWebsocketOnOpen() {
      console.log('socket连接成功')
      this.SJGWebsocket.onmessage()
    },
    // 连接建立失败重连
    SJGWebsocketOnError(e) {
      this.SJGInitWebSocket()
    },
    // 数据接收
    SJGWebsocketOnMessage(e) {
      // let data = { "data": { "FanFrequencyInfo": { "1#10处拐角冷却风机": "0", "1#L型吊墙冷却风机": "0", "1#助燃风机": "44.8", "1#澄清带池壁风机": "40", "1#融化带池壁风机": "43", "1#钢碹碴小炉垛风机": "48", "2#10处拐角冷却风机": "50", "2#L型吊墙冷却风机": "49.7", "2#助燃风机": "0", "2#澄清带池壁风机": "0", "2#融化带池壁风机": "0", "2#钢碹碴小炉垛风机": "48", "3#澄清带池壁风机": "0", "3#融化带池壁风机": "0", "4#澄清带池壁风机": "40", "4#融化带池壁风机": "43" } }, "type": "FanFrequencyInfo" }
      // let obj = JSON.parse(data.data)
      this.SJGWsData = e?.data ? JSON.parse(e?.data) : {}
      if (this.SJGWsData.type === 'isra') {
        this.ISRAList = this.SJGWsData.detData.map((ele, index) => {
          // if (ele.progressRate != 1) {
          return {
            id: ele.id,
            linename: ele.linename,
            type: ele.type,
            num: ele.num,
            time:ele.time,
            percent: ele.percent
          }
          // }
        });
        
        this.total2 = Math.ceil(this.SJGWsData?.detData?.length / 9)
        if ( this.page2 > this.total2) {
          this.page2 = 1
        }
        if (!this.firstContent2) {
          setInterval(pageFun2 = () => {
            if (this.page2 >= this.total2) {
              this.page2 = 1
            } else {
              this.page2 += 1
            }
          }, 30000)
          this.firstContent2 = true
        }
      }
    },
    windowWidth(value) {
      this.clientWidth = value
      this.beilv2 = this.clientWidth / 1920
    },
    // fetchList(type) {
    //   switch (type) {
    //     case 'order-process':
    //       return axios({
    //         url: '/analysis/factory-monitor/order',
    //         method: 'post'
    //       }).then(res => {
    //         if (res.data) {
    //           this.orderProcessList = res.data
    //           // this.orderProcessList = [
    //           //   { id: 1, name: '订单1', outRate: 0.5 },
    //           //   { id: 2, name: '订单2', outRate: 0.54 },
    //           //   { id: 3, name: '订单3', outRate: 0.45 },
    //           //   { id: 4, name: '订单4', outRate: 0.65 },
    //           //   { id: 5, name: '订单5', outRate: 0.35 },
    //           //   { id: 6, name: '订单6', outRate: 0.15 },
    //           //   { id: 7, name: '订单7', outRate: 0.5 },
    //           //   { id: 8, name: '订单8', outRate: 0.5 }
    //           // ]
    //         } else {
    //           this.orderProcessList.splice(0)
    //         }
    //       })
    //   }
    // },
    change() {
      this.isFullScreen = screenfull.isFullscreen
    },
    init() {
      if (screenfull.enabled) {
        screenfull.on('change', this.change)
      }
    },
    destroy() {
      if (screenfull.enabled) {
        screenfull.off('change', this.change)
      }
    },
    changeFullScreen() {
      this.containerWidth = 223223223
      if (!screenfull.enabled) {
        this.$message({
          message: 'you browser can not work',
          type: 'warning'
        })
        return false
      }
      screenfull.toggle(this.$refs.container)
    }
  }
}
</script>

<style lang="scss" scoped>
.visual-container {
  width: 1920px;
  height: 1080px;
  background: url('../../assets/img/OperationalOverview/back.png') no-repeat;
  background-size: cover;

  // opacity: .8;
  .container-title {
    width: 100%;
    background: url('../../assets/img/OperationalOverview/title.png') no-repeat;
    background-size: 100% 100%;
    color: #00fff0;
    text-align: center;

    .unit {
      position: absolute;
      left: 260px;
      top: 25px;
      font-size: 20px;
    }

    .time {
      position: absolute;
      left: 1360px;
      top: 25px;
      font-size: 20px;
    }

    .title-button {
      color: #00fff0;
      font-size: 20px;
      position: absolute;
    }
  }

  .container-main {
    padding: 10px;
  }
}

.now-team-title {
  margin: 0;
  margin-top: -1em;
  font-size: 1.2em;
  line-height: 2em;
  color: #fff;
}

.main-title {
  text-align: center;
}

.now-secondary-title {
  margin: 0;
  font-size: 1em;
  line-height: 2em;
  color: #fff;
}

.now-team-content {
  font-size: 3em;
  line-height: 1em;
  color: #52fff1;
  text-align: center;
}

::v-deep .el-progress-bar__inner {
  background-color: unset;
  background-image: linear-gradient(to right, #4573fe, #47f8dc);
}

.visual-select {
  position: absolute;
  right: 1em;
  top: 2em;
}

// .container-main {
//    padding: 5px;
//  }
</style>

<style lang="scss">
.visual-container {
  ::-webkit-scrollbar {
    width: 8px;
    height: 8px;
    background-color: transparent;
  }

  ::-webkit-scrollbar-track-piece {
    background: #1b2b3d;
  }

  ::-webkit-scrollbar-corner {
    background: #1b2b3d;
  }

  ::-webkit-scrollbar-track {
    width: 6px;
    background: #1b2b3d;
    -webkit-border-radius: 2em;
    -moz-border-radius: 2em;
    border-radius: 2em;
  }

  ::-webkit-scrollbar-thumb {
    background: rgba($color: #5bc4be, $alpha: 0.7);
    background-clip: padding-box;
    min-height: 28px;
    -webkit-border-radius: 2em;
    -moz-border-radius: 2em;
    border-radius: 2em;
    transition: background-color 0.3s;
    cursor: pointer;
  }

  ::-webkit-scrollbar-thumb:hover {
    background-color: rgba($color: #5bc4be, $alpha: 1);
  }
}

.coldSelect {
  .el-input {
    min-height: 10px;
  }

  .el-input__inner {
    background-color: rgba($color: #31878c, $alpha: 0.29);
    border: rgba($color: #31878c, $alpha: 0.29);
    color: aliceblue;
  }

  .el-divider--vertical {
    height: 174px;
    width: 1px;
    border: rgba(255, 255, 255, 0.15);
    color: rgba(255, 255, 255, 0.15);
    margin-left: 3em;
  }
}
</style>

<style scoped>
.flex-col {
  flex-direction: column;
}

.flex-1 {
  flex: 1 1;
}

.h-full {
  height: calc(100vh - 150px);
}

/* .container-main {
  min-height: calc(100vh - 10em);
} */
</style>
