<template>
	<div class="app-container">
		<!-- 搜索工作栏 -->
		<SearchBar
			:formConfigs="searchBarFormConfig"
			ref="search-bar"
			@headBtnClick="handleSearchBarBtnClick" />

		<!-- 列表 -->
		<base-table
			:table-props="tableProps"
			:page="queryParams.pageNo"
			:limit="queryParams.pageSize"
			:table-data="list"
			@emit-fun="handleEmitFun">
			<method-btn
				v-if="tableBtn.length"
				slot="handleBtn"
				label="操作"
				:method-list="tableBtn"
				@clickBtn="handleTableBtnClick" />
		</base-table>

		<!-- 分页组件 -->
		<pagination
			v-show="total > 0"
			:total="total"
			:page.sync="queryParams.pageNo"
			:limit.sync="queryParams.pageSize"
			@pagination="getList" />

		<!-- 对话框(添加 / 修改) -->
		<base-dialog
			:dialogTitle="title"
			:dialogVisible="open"
			@cancel="cancel"
			@confirm="submitForm">
			<el-form ref="form" :model="form" :rules="rules" label-width="100px">
				<el-form-item label="检测类型id" prop="typeId">
					<el-select v-model="form.typeId" placeholder="请选择检测类型id">
						<el-option label="请选择字典生成" value="" />
					</el-select>
				</el-form-item>
				<el-form-item label="检测内容" prop="content">
					<el-input v-model="form.content" placeholder="请输入检测内容" />
				</el-form-item>
				<el-form-item label="检测编码" prop="code">
					<el-input v-model="form.code" placeholder="请输入检测编码" />
				</el-form-item>
				<el-form-item label="备注" prop="remark">
					<el-input v-model="form.remark" placeholder="请输入备注" />
				</el-form-item>
			</el-form>
		</base-dialog>

	</div>
</template>

<script>
import {
	createQualityInspectionDet,
	updateQualityInspectionDet,
	deleteQualityInspectionDet,
	getQualityInspectionDet,
	getQualityInspectionDetPage,
	exportQualityInspectionDetExcel,
} from '@/api/base/qualityInspectionDet';

export default {
	name: 'QualityInspectionDet',
	components: {},
	data() {
		return {
			searchBarFormConfig: [
				{
					type: 'input',
					label: '检测内容',
					placeholder: '请输入检测内容',
					param: 'content',
				},
				{
					type: 'datePicker',
					label: '创建时间',
					dateType: 'daterange', // datetimerange
					format: 'yyyy-MM-dd HH:mm:ss',
					valueFormat: 'yyyy-MM-ddTHH:mm:ss',
					rangeSeparator: '-',
					startPlaceholder: '开始日期',
					endPlaceholder: '结束日期',
					defaultTime: ['00:00:00', '23:59:59'],
					param: 'createTime',
					width: 350,
				},
				{
					type: 'button',
					btnName: '查询',
					name: 'search',
					color: 'primary',
				},
				// {
				// 	type: 'button',
				// 	btnName: '重置',
				// 	name: 'reset',
				// },
				{
					type: 'separate',
				},
				{
					type: this.$auth.hasPermi('base:quality-inspection-det:create')
						? 'button'
						: '',
					btnName: '新增',
					name: 'add',
					plain: true,
					color: 'success',
				},
				// {
				// 	type: this.$auth.hasPermi('base:quality-inspection-type:export')
				// 		? 'button'
				// 		: '',
				// 	btnName: '导出',
				// 	name: 'export',
				// 	color: 'warning',
				// },
			],
			tableBtn: [
				this.$auth.hasPermi('base:quality-inspection-det:update') ? {
					type: 'edit',
					btnName: '修改',
				} : undefined,
				this.$auth.hasPermi('base:quality-inspection-det:delete') ? {
					type: 'delete',
					btnName: '删除',
				} : undefined,
			].filter(v=>v),
			tableData: [],
			tableProps: [
				{
					prop: 'createTime',
					label: '添加时间',
					fixed: true,
					width: 180,
					filter: (val) => moment(val).format('yyyy-MM-DD HH:mm:ss'),
				},
				{ prop: 'typeId', label: '检测类型ID', align: 'center' },
				{ prop: 'content', label: '检测类型内容', align: 'center' },
				{ prop: 'code', label: '检测编码', align: 'center' },
				{ prop: 'remark', label: '备注', align: 'center' },
			],
			// 遮罩层
			loading: true,
			// 导出遮罩层
			exportLoading: false,
			// 显示搜索条件
			showSearch: true,
			// 总条数
			total: 0,
			// 质量检测信息基础列表
			list: [],
			// 弹出层标题
			title: '',
			// 是否显示弹出层
			open: false,
			// 查询参数
			queryParams: {
				pageNo: 1,
				pageSize: 10,
				content: null,
				createTime: [],
			},
			// 表单参数
			form: {},
			// 表单校验
			rules: {
				typeId: [
					{ required: true, message: '检测类型id不能为空', trigger: 'change' },
				],
				content: [
					{ required: true, message: '检测内容不能为空', trigger: 'blur' },
				],
			},
		};
	},
	created() {
		this.getList();
	},
	methods: {
		/** base table related */
		handleTableBtnClick({ data, type }) {
			switch (type) {
				case 'edit':
					this.handleUpdate(data);
					break;
				case 'delete':
					this.handleDelete(data);
					break;
			}
		},
		/** search bar related */
		handleSearchBarBtnClick(btn) {
			const keys = ['name', 'createTime']; // timeVal
			switch (btn.btnName) {
				case 'search':
					keys.forEach((key) => {
						if (key == 'timeVal') {
							this.queryParams['startTime'] = btn.timeVal[0];
							this.queryParams['endTime'] = btn.timeVal[1];
							return;
						}
						this.queryParams[key] = btn[key] || null;
					});
					this.handleQuery();
					break;
				case 'add':
					this.handleAdd();
					break;
				case 'export':
					this.handleExport();
					break;
				case 'reset':
					this.$refs['search-bar'].resetForm();
					this.resetQuery();
					break;
			}
		},
		handleEmitFun(val) {
			console.log('emit unf', val);
		},
		/** 查询列表 */
		getList() {
			this.loading = true;
			// 执行查询
			getQualityInspectionDetPage(this.queryParams).then((response) => {
				this.list = response.data.list;
				this.total = response.data.total;
				this.loading = false;
			});
		},
		/** 取消按钮 */
		cancel() {
			this.open = false;
			this.reset();
		},
		/** 表单重置 */
		reset() {
			this.form = {
				id: undefined,
				typeId: undefined,
				content: undefined,
				code: undefined,
				remark: undefined,
			};
			this.resetForm('form');
		},
		/** 搜索按钮操作 */
		handleQuery() {
			this.queryParams.pageNo = 1;
			this.getList();
		},
		/** 重置按钮操作 */
		resetQuery() {
			this.resetForm('queryForm');
			this.handleQuery();
		},
		/** 新增按钮操作 */
		handleAdd() {
			this.reset();
			this.open = true;
			this.title = '添加质量检测信息基础';
		},
		/** 修改按钮操作 */
		handleUpdate(row) {
			this.reset();
			const id = row.id;
			getQualityInspectionDet(id).then((response) => {
				this.form = response.data;
				this.open = true;
				this.title = '修改质量检测信息基础';
			});
		},
		/** 提交按钮 */
		submitForm() {
			this.$refs['form'].validate((valid) => {
				if (!valid) {
					return;
				}
				// 修改的提交
				if (this.form.id != null) {
					updateQualityInspectionDet(this.form).then((response) => {
						this.$modal.msgSuccess('修改成功');
						this.open = false;
						this.getList();
					});
					return;
				}
				// 添加的提交
				createQualityInspectionDet(this.form).then((response) => {
					this.$modal.msgSuccess('新增成功');
					this.open = false;
					this.getList();
				});
			});
		},
		/** 删除按钮操作 */
		handleDelete(row) {
			const id = row.id;
			this.$modal
				.confirm('是否确认删除质量检测信息基础编号为"' + id + '"的数据项?')
				.then(function () {
					return deleteQualityInspectionDet(id);
				})
				.then(() => {
					this.getList();
					this.$modal.msgSuccess('删除成功');
				})
				.catch(() => {});
		},
		/** 导出按钮操作 */
		handleExport() {
			// 处理查询参数
			let params = { ...this.queryParams };
			params.pageNo = undefined;
			params.pageSize = undefined;
			this.$modal
				.confirm('是否确认导出所有质量检测信息基础数据项?')
				.then(() => {
					this.exportLoading = true;
					return exportQualityInspectionDetExcel(params);
				})
				.then((response) => {
					this.$download.excel(response, '质量检测信息基础.xls');
					this.exportLoading = false;
				})
				.catch(() => {});
		},
	},
};
</script>
