<template>
	<div class="app-container">
		<!-- 搜索工作栏 -->
		<SearchBar
			:formConfigs="searchBarFormConfig"
			ref="search-bar"
			@headBtnClick="handleSearchBarBtnClick" />

		<!-- 列表 -->
		<base-table
			:table-props="tableProps"
			:page="queryParams.pageNo"
			:limit="queryParams.pageSize"
			:table-data="list"
			@emitFun="handleEmitFun"
			:max-height="tableH">
			<method-btn
				v-if="tableBtn.length"
				slot="handleBtn"
				label="操作"
				:width="80"
				fixed="right"
				:method-list="tableBtn"
				@clickBtn="handleTableBtnClick" />
		</base-table>

		<!-- 分页组件 -->
		<pagination
			v-show="total > 0"
			:total="total"
			:page.sync="queryParams.pageNo"
			:limit.sync="queryParams.pageSize"
			@pagination="getList" />

		<!-- 对话框(添加 / 修改) -->
		<base-dialog
			:dialogTitle="title"
			:dialogVisible="open"
			width="40%"
			@close="cancel"
			@cancel="cancel"
			@confirm="submitForm">
			<DialogForm
				v-if="open"
				ref="form"
				v-model="form"
				:rows="[
					[
						{
							select: true,
							label: '检测类型',
							prop: 'typeId',
							url: '/base/quality-inspection-type/listAll',
							rules: [
								{
									required: true,
									message: '检测类型不能为空',
									trigger: 'blur',
								},
							],
							bind: {
								filterable: true,
							},
						},
						{
							input: true,
							label: '检测内容',
							prop: 'content',
							rules: [
								{
									required: true,
									message: '检测内容不能为空',
									trigger: 'blur',
								},
							],
						},
					],

					[
						{
							input: true,
							label: '内容编码',
							prop: 'code',
							url: '/base/quality-inspection-det/getCode',
						},
						{ input: true, label: '备注', prop: 'remark' },
					],
				]" />
		</base-dialog>
	</div>
</template>

<script>
import {
	createQualityInspectionDet,
	updateQualityInspectionDet,
	deleteQualityInspectionDet,
	getQualityInspectionDet,
	getQualityInspectionDetPage,
	exportQualityInspectionDetExcel,
} from '@/api/base/qualityInspectionDet';

import moment from 'moment';

import basicPageMixin from '@/mixins/lb/basicPageMixin';
import tableHeightMixin from '@/mixins/tableHeightMixin';

export default {
	name: 'QualityInspectionDet',
	mixins: [basicPageMixin, tableHeightMixin],
	data() {
		return {
			typeList: [], // 检测类型列表
			searchBarFormConfig: [
				{
					type: 'input',
					label: '检测内容',
					placeholder: '请输入检测内容',
					param: 'content',
				},
				// {
				// 	type: 'datePicker',
				// 	label: '创建时间',
				// 	dateType: 'daterange', // datetimerange
				// 	// format: 'yyyy-MM-dd HH:mm:ss',
				// 	format: 'yyyy-MM-dd',
				// 	valueFormat: 'yyyy-MM-dd HH:mm:ss',
				// 	rangeSeparator: '-',
				// 	startPlaceholder: '开始日期',
				// 	endPlaceholder: '结束日期',
				// 	defaultTime: ['00:00:00', '23:59:59'],
				// 	param: 'createTime',
				// 	width: 350,
				// },
				{
					type: 'button',
					btnName: '查询',
					name: 'search',
					color: 'primary',
				},
				// {
				// 	type: 'button',
				// 	btnName: '重置',
				// 	name: 'reset',
				// },
				{
					type: 'separate',
				},
				{
					type: this.$auth.hasPermi('base:quality-inspection-det:create')
						? 'button'
						: '',
					btnName: '新增',
					name: 'add',
					plain: true,
					color: 'success',
				},
				// {
				// 	type: this.$auth.hasPermi('base:quality-inspection-type:export')
				// 		? 'button'
				// 		: '',
				// 	btnName: '导出',
				// 	name: 'export',
				// 	color: 'warning',
				// },
			],
			tableBtn: [
				this.$auth.hasPermi('base:quality-inspection-det:update')
					? {
							type: 'edit',
							btnName: '修改',
					  }
					: undefined,
				this.$auth.hasPermi('base:quality-inspection-det:delete')
					? {
							type: 'delete',
							btnName: '删除',
					  }
					: undefined,
			].filter((v) => v),
			tableProps: [
				{
					prop: 'createTime',
					label: '添加时间',
					width: 160,
					filter: (val) => moment(val).format('yyyy-MM-DD HH:mm:ss'),
				},
				{ prop: 'typeName', label: '检测类型', showOverflowtooltip: true },
				{ prop: 'content', label: '检测内容', showOverflowtooltip: true },
				{ prop: 'code', label: '检测编码', showOverflowtooltip: true },
				{ prop: 'remark', label: '备注', showOverflowtooltip: true },
			],
			// 查询参数
			queryParams: {
				pageNo: 1,
				pageSize: 20,
				content: null,
				createTime: [],
			},
			// 搜索框需要的 keys, 与上面 queryParams 的除 pageNo, pageSize 之外的 key 一一对应
			searchBarKeys: ['content', 'createTime'],
			form: {
				id: undefined,
				typeId: undefined,
				content: undefined,
				code: undefined,
				remark: undefined,
			},
		};
	},
	created() {
		this.getList();
		this.getTypeList();
	},
	methods: {
		/** 获取检测类型id */
		getTypeList() {
			this.$axios('/base/quality-inspection-type/listAll').then((response) => {
				this.typeList = response.data.map((item) => {
					return {
						label: item.name,
						value: item.id,
					};
				});
			});
		},
		/** 查询列表 */
		getList() {
			this.loading = true;
			// 执行查询
			getQualityInspectionDetPage(this.queryParams).then((response) => {
				this.list = response.data.list;
				this.total = response.data.total;
				this.loading = false;
			});
		},
		/** 表单重置 */
		reset() {
			this.form = {
				id: undefined,
				typeId: undefined,
				content: undefined,
				code: undefined,
				remark: undefined,
			};
			this.resetForm('form');
		},
		/** 新增按钮操作 */
		handleAdd() {
			this.reset();
			this.open = true;
			this.title = '添加质量检测信息';
		},
		/** 修改按钮操作 */
		handleUpdate(row) {
			this.reset();
			const id = row.id;
			getQualityInspectionDet(id).then((response) => {
				this.form = response.data;
				this.open = true;
				this.title = '修改质量检测信息';
			});
		},
		/** 提交按钮 */
		submitForm() {
			this.$refs['form'].validate((valid) => {
				if (!valid) {
					return;
				}
				// 修改的提交
				if (this.form.id != null) {
					updateQualityInspectionDet(this.form).then((response) => {
						this.$modal.msgSuccess('修改成功');
						this.open = false;
						this.getList();
					});
					return;
				}
				// 添加的提交
				createQualityInspectionDet(this.form).then((response) => {
					this.$modal.msgSuccess('新增成功');
					this.open = false;
					this.getList();
				});
			});
		},
		/** 删除按钮操作 */
		handleDelete(row) {
			const id = row.id;
			this.$modal
				.delConfirm(row.content)
				.then(function () {
					return deleteQualityInspectionDet(id);
				})
				.then(() => {
					this.getList();
					this.$modal.msgSuccess('删除成功');
				})
				.catch(() => {});
		},
		/** 导出按钮操作 */
		handleExport() {
			// 处理查询参数
			let params = { ...this.queryParams };
			params.pageNo = undefined;
			params.pageSize = undefined;
			this.$modal
				.confirm('是否确认导出所有质量检测信息基础数据项?')
				.then(() => {
					this.exportLoading = true;
					return exportQualityInspectionDetExcel(params);
				})
				.then((response) => {
					this.$download.excel(response, '质量检测信息基础.xls');
					this.exportLoading = false;
				})
				.catch(() => {});
		},
	},
};
</script>

<style>
.el-select {
	width: 100% !important;
}
</style>
